export interface OtpIconType {
  className?: string;
  onClick?: () => void;
}

export const OtpIcon = ({ className, onClick }: OtpIconType) => {
  return (
    <svg
      width="111"
      height="97"
      viewBox="0 0 111 97"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
      className={className}
      onClick={onClick}

    >
      <g clipPath="url(#clip0_4077_31067)">
        <path
          d="M5.35589 33.0546L0.00374352 30.0446C-0.068451 26.8243 0.647747 23.635 2.09015 20.7537C3.32411 26.3459 9.81803 29.0065 12.8142 33.8892C13.737 35.4192 14.3032 37.1369 14.4707 38.9151C14.6383 40.6933 14.4029 42.4863 13.7821 44.1614L14.1341 48.4972C11.368 47.6699 8.81429 46.2537 6.64906 44.3461C4.48382 42.4385 2.7585 40.0849 1.59198 37.4474C0.952239 35.9613 0.502474 34.4007 0.253298 32.8024C2.7487 33.0675 5.35589 33.0546 5.35589 33.0546Z"
          fill="#F2F2F2"
        />
        <path
          d="M101.57 87.8143L101.734 84.1297C103.445 83.2166 105.353 82.7342 107.293 82.7246C104.623 84.9041 104.957 89.1055 103.146 92.0365C102.575 92.9463 101.806 93.7161 100.896 94.2887C99.9856 94.8612 98.9582 95.222 97.8895 95.3443L95.6553 96.7102C95.3487 95.0036 95.4163 93.251 95.8534 91.5731C96.2905 89.8951 97.0867 88.3318 98.1872 86.9907C98.8121 86.2444 99.5285 85.5797 100.32 85.0122C100.855 86.421 101.57 87.8143 101.57 87.8143Z"
          fill="#F2F2F2"
        />
        <path
          d="M95.8128 94.814L93.7896 94.8139L92.8271 87.0223L95.8131 87.0225L95.8128 94.814Z"
          fill="#FFB6B6"
        />
        <path
          d="M96.3287 96.7721L89.8054 96.7719V96.6895C89.8055 96.0171 90.073 95.3723 90.5491 94.8969C91.0253 94.4214 91.6711 94.1543 92.3445 94.1543L93.5362 93.2517L95.7594 94.1544L96.3288 94.1545L96.3287 96.7721Z"
          fill="#5F6C7B"
        />
        <path
          d="M86.4139 94.814L84.3909 94.8139L83.4285 87.0223L86.4144 87.0225L86.4139 94.814Z"
          fill="#FFB6B6"
        />
        <path
          d="M86.9298 96.7721L80.4065 96.7719V96.6895C80.4065 96.0171 80.6741 95.3723 81.1502 94.8969C81.6264 94.4214 82.2722 94.1543 82.9455 94.1543L84.1373 93.2517L86.3605 94.1544L86.9299 94.1545L86.9298 96.7721Z"
          fill="#5F6C7B"
        />
        <path
          d="M85.5381 52.2169L98.6972 52.5454C101.196 53.9008 101.234 56.8343 100.415 60.3173C100.415 60.3173 100.692 62.3874 100.139 62.9394C99.5862 63.4915 99.3097 63.4915 99.5862 64.4576C99.8626 65.4236 98.4021 67.0015 98.5795 67.1787C98.7569 67.3558 99.1715 68.3219 99.1715 68.3219L97.7893 76.1885C97.7893 76.1885 96.8218 89.8515 96.5453 90.1276C96.2689 90.4036 95.9925 90.1276 96.2689 90.8176C96.5453 91.5077 96.8218 91.2316 96.5453 91.5077C96.3005 91.7713 96.0698 92.0477 95.8542 92.3357H92.5125C92.5125 92.3357 92.2605 90.9556 92.2605 90.8176C92.2605 90.6796 91.9841 89.8515 91.9841 89.7135C91.9841 89.5755 92.2284 89.3315 92.2284 89.3315C92.3129 89.051 92.3699 88.7629 92.3988 88.4714C92.3988 88.1954 93.2281 77.5686 93.2281 77.5686L91.5694 63.7675L87.5611 77.2926C87.5611 77.2926 87.5611 89.1615 87.2846 89.4375C87.0082 89.7135 87.0082 89.5755 87.1464 90.1276C87.2846 90.6796 87.8375 90.5416 87.4229 90.9556C87.0082 91.3696 86.87 90.6796 87.0082 91.3696L87.1464 92.0597L82.9998 92.1189C82.9998 92.1189 82.447 90.9556 82.7234 90.5416C82.9998 90.1276 82.9832 90.2406 82.646 89.563C82.3087 88.8855 82.1705 88.7474 82.3087 88.6094C82.4469 88.4714 82.4469 87.7374 82.4469 87.7374L83.138 74.5323C83.138 74.5323 83.2763 60.5933 83.2763 60.1792C83.2867 59.9662 83.2474 59.7536 83.1614 59.5584V58.9964L83.6909 57.005L85.5381 52.2169Z"
          fill="#5F6C7B"
        />
        <path
          d="M93.4431 24.896C95.7012 24.896 97.5317 23.0682 97.5317 20.8136C97.5317 18.5589 95.7012 16.7311 93.4431 16.7311C91.185 16.7311 89.3545 18.5589 89.3545 20.8136C89.3545 23.0682 91.185 24.896 93.4431 24.896Z"
          fill="#FFB6B6"
        />
        <path
          d="M91.3986 27.5942C90.5178 28.117 89.9909 29.0777 89.6884 30.0553C89.1284 31.8652 88.7914 33.7365 88.6846 35.6278L88.3652 41.2901L84.4084 53.3465C87.8376 56.2437 100.727 54.005 100.727 54.005C100.727 54.005 101.123 53.8733 100.727 53.4782C100.332 53.0831 99.9464 53.4332 100.342 53.0381C100.738 52.643 100.465 53.0831 100.333 52.6881C100.201 52.293 100.333 52.5564 100.465 52.4247C100.597 52.293 99.444 51.1078 99.444 51.1078L100.499 44.1872L101.818 30.228C100.235 28.2526 97.0523 27.0881 97.0523 27.0881L96.2299 25.61L92.1177 25.9385L91.3986 27.5942Z"
          fill="#E6E6E6"
        />
        <path
          d="M90.8379 18.4177C90.9961 18.4189 91.1536 18.4395 91.3067 18.4791C91.6087 18.5516 91.9153 18.6029 92.2244 18.6328C93.1709 18.7217 94.0603 19.1247 94.7505 19.7775C95.4407 20.4304 95.8919 21.2953 96.032 22.2342C96.2696 22.0274 96.8102 21.6469 97.2533 22.0005C97.26 22.0061 97.264 22.009 97.2796 22.0016C97.5738 21.8622 98.0962 20.1465 98.112 18.6359C98.1204 17.8341 97.994 16.8102 97.3445 16.486L97.3103 16.4689L97.3013 16.4318C97.258 16.2514 96.7732 15.9436 95.9306 15.7039C94.3995 15.2685 92.1171 14.4202 90.8319 15.6686C90.7346 16.0895 90.4182 16.9901 90.0985 17.0922C89.7446 17.2052 89.4389 17.3027 89.3907 17.7363C89.3504 18.3532 89.3534 18.9722 89.3994 19.5888C89.5194 19.2115 89.7548 18.8813 90.0726 18.6446C90.2985 18.4928 90.5656 18.4136 90.8379 18.4177Z"
          fill="#5F6C7B"
        />
        <path
          d="M83.2279 40.9748L89.9066 36.704L86.5428 32.2391L83.2211 36.3189L72.8717 36.9526C72.5995 36.684 72.2549 36.5002 71.8799 36.4237C71.5049 36.3472 71.1156 36.3813 70.7597 36.5219C70.4038 36.6624 70.0965 36.9033 69.8753 37.2153C69.6541 37.5272 69.5286 37.8966 69.5141 38.2785C69.4996 38.6604 69.5967 39.0383 69.7935 39.3661C69.9903 39.6938 70.2784 39.9573 70.6227 40.1245C70.9669 40.2916 71.3524 40.3551 71.7321 40.3072C72.1119 40.2593 72.4695 40.1022 72.7613 39.8549L83.2279 40.9748Z"
          fill="#FFB6B6"
        />
        <path
          d="M96.1054 30.7429C96.493 33.0852 89.1729 37.5581 89.1729 37.5581C89.1728 37.0083 84.8038 41.1588 84.6066 40.7028C84.0461 39.4069 83.652 36.3375 82.8689 35.8462C82.421 35.5653 85.5663 32.9259 85.5663 32.9259C85.5663 32.9259 87.2128 31.2698 89.3734 29.1808C89.9733 28.5788 90.7159 28.1383 91.5322 27.9C92.3485 27.6618 93.2119 27.6336 94.042 27.8182C94.042 27.8182 95.7178 28.4006 96.1054 30.7429Z"
          fill="#E6E6E6"
        />
        <path
          d="M109.871 42.0959L105.454 35.5191L101.054 38.9717L105.21 42.2012L106.063 52.5192C105.8 52.7967 105.623 53.1446 105.555 53.5206C105.486 53.8965 105.528 54.2844 105.677 54.6367C105.825 54.989 106.073 55.2907 106.39 55.5049C106.707 55.7191 107.079 55.8365 107.462 55.8429C107.845 55.8493 108.221 55.7444 108.545 55.541C108.869 55.3376 109.127 55.0444 109.287 54.6972C109.447 54.35 109.502 53.9639 109.446 53.5858C109.39 53.2077 109.225 52.8541 108.972 52.568L109.871 42.0959Z"
          fill="#FFB6B6"
        />
        <path
          d="M99.3535 29.4573C101.691 29.0208 106.324 36.2335 106.324 36.2335C105.774 36.2452 110.022 40.5188 109.57 40.7253C108.284 41.3122 105.219 41.7706 104.744 42.5629C104.472 43.0159 101.763 39.9319 101.763 39.9319C101.763 39.9319 100.069 38.3233 97.9319 36.2107C97.3166 35.6246 96.8597 34.8926 96.6038 34.0828C96.348 33.273 96.3015 32.4117 96.4688 31.5791C96.4688 31.5791 97.0164 29.8939 99.3535 29.4573Z"
          fill="#E6E6E6"
        />
        <path
          d="M111 96.8045C111 96.8302 110.995 96.8557 110.985 96.8794C110.975 96.9032 110.961 96.9248 110.943 96.9429C110.925 96.9611 110.903 96.9755 110.879 96.9853C110.855 96.9951 110.83 97.0001 110.804 97H64.6996C64.6477 97 64.5979 96.9794 64.5612 96.9428C64.5245 96.9061 64.5039 96.8564 64.5039 96.8045C64.5039 96.7527 64.5245 96.703 64.5612 96.6664C64.5979 96.6297 64.6477 96.6091 64.6996 96.6091H110.804C110.83 96.609 110.855 96.614 110.879 96.6238C110.903 96.6336 110.925 96.648 110.943 96.6662C110.961 96.6843 110.975 96.7059 110.985 96.7297C110.995 96.7534 111 96.7789 111 96.8045Z"
          fill="#CCCCCC"
        />
        <path
          d="M68.2895 37.5768H12.3354C11.4612 37.5778 10.6231 37.925 10.0049 38.5422C9.38678 39.1594 9.03907 39.9963 9.03809 40.8692V75.6533C9.03908 76.5262 9.38679 77.363 10.0049 77.9802C10.6231 78.5974 11.4612 78.9446 12.3354 78.9456H68.2895C69.1637 78.9446 70.0018 78.5974 70.62 77.9802C71.2381 77.363 71.5859 76.5262 71.5868 75.6533V40.8692C71.5859 39.9963 71.2382 39.1594 70.62 38.5422C70.0019 37.925 69.1637 37.5778 68.2895 37.5768Z"
          fill="#FFD633"
        />
        <path
          d="M68.2895 37.5768H12.3354C11.4612 37.5778 10.6231 37.925 10.0049 38.5422C9.38678 39.1594 9.03907 39.9963 9.03809 40.8692V75.6533C9.03908 76.5262 9.38679 77.363 10.0049 77.9802C10.6231 78.5974 11.4612 78.9446 12.3354 78.9456H68.2895C69.1637 78.9446 70.0018 78.5974 70.62 77.9802C71.2381 77.363 71.5859 76.5262 71.5868 75.6533V40.8692C71.5859 39.9963 71.2382 39.1594 70.62 38.5422C70.0019 37.925 69.1637 37.5778 68.2895 37.5768ZM69.3716 62.5627C69.3582 66.1039 67.9554 69.4989 65.464 72.0192C62.9726 74.5396 59.5911 75.9845 56.045 76.0442C50.3674 76.1179 59.1863 76.1467 52.3388 76.1467C36.6807 76.1467 20.3536 75.9973 14.2617 75.9005C13.4603 75.8839 12.697 75.5552 12.1349 74.9845C11.5728 74.4138 11.2564 73.6463 11.2533 72.8458V40.8717C11.2536 40.5851 11.3676 40.3103 11.5704 40.1073C11.7731 39.9044 12.0481 39.7899 12.3352 39.7889H68.2873C68.5743 39.7892 68.8495 39.903 69.0527 40.1054C69.2559 40.3078 69.3706 40.5823 69.3716 40.8688V62.5627Z"
          fill="#333333"
        />
        <path
          d="M61.4017 17.5471H18.7705C18.3933 17.5476 18.0255 17.6644 17.7172 17.8814C17.4089 18.0985 17.1753 18.4052 17.0481 18.7598L10.464 37.2039C10.3658 37.4792 10.3351 37.774 10.3747 38.0636C10.4142 38.3532 10.5228 38.6291 10.6914 38.868C10.8599 39.107 11.0834 39.3021 11.3431 39.4369C11.6028 39.5717 11.8911 39.6422 12.1838 39.6427L69.3592 39.744H69.3618C69.6643 39.744 69.9622 39.669 70.2286 39.5257C70.495 39.3825 70.7217 39.1755 70.8882 38.9233C71.0548 38.671 71.1561 38.3815 71.183 38.0806C71.2099 37.7796 71.1616 37.4767 71.0424 37.199L63.0823 18.6536C62.9416 18.325 62.7073 18.045 62.4085 17.8482C62.1097 17.6515 61.7596 17.5468 61.4017 17.5471Z"
          fill="#333333"
        />
        <path
          d="M71.1904 37.5996C71.1902 37.8469 71.1398 38.0916 71.0423 38.3189L63.0827 52.5947C62.941 52.9226 62.7064 53.2019 62.4077 53.3983C62.109 53.5947 61.7593 53.6996 61.4016 53.7H18.7711C18.3938 53.6997 18.0257 53.5831 17.7172 53.3661C17.4087 53.1492 17.1748 52.8425 17.0473 52.4879L10.4644 38.314C10.3837 38.0882 10.3484 37.8487 10.3605 37.6093C10.3725 37.3698 10.4317 37.1351 10.5347 36.9185C10.6376 36.7019 10.7823 36.5077 10.9605 36.347C11.1387 36.1862 11.3468 36.0622 11.5731 35.9818C11.7688 35.9112 11.9753 35.8751 12.1833 35.875L19.1675 35.8619L22.0181 35.857L59.5281 35.7913L62.3804 35.7864L69.3596 35.7732H69.3613C69.8463 35.7733 70.3115 35.9657 70.6545 36.3082C70.9975 36.6507 71.1903 37.1152 71.1904 37.5996Z"
          fill="#333333"
        />
        <path
          d="M16.5302 63.6689C17.3755 63.6689 28.9843 64.3773 28.9843 65.2214C28.9843 66.0655 17.3755 66.7257 16.5302 66.7257C16.1242 66.7257 15.7349 66.5646 15.4478 66.278C15.1608 65.9914 14.9995 65.6026 14.9995 65.1973C14.9995 64.792 15.1608 64.4032 15.4478 64.1166C15.7349 63.83 16.1242 63.6689 16.5302 63.6689Z"
          fill="#333333"
        />
        <path
          d="M58.7468 6.32663H22.801C21.8377 6.32774 20.9141 6.71034 20.233 7.39049C19.5518 8.07064 19.1686 8.99281 19.1675 9.95469V53.7001H61.4016C61.7484 53.7011 62.0882 53.6025 62.3803 53.4159V9.95469C62.3792 8.99281 61.996 8.07065 61.3148 7.39049C60.6337 6.71034 59.7101 6.32774 58.7468 6.32663Z"
          fill="#E6E6E6"
        />
        <path
          d="M45.0268 9.26816H25.3276C24.4504 9.26901 23.6093 9.61721 22.9889 10.2364C22.3685 10.8556 22.0194 11.6952 22.0181 12.571V53.7H59.5281V23.7476C59.5236 19.9088 57.9944 16.2284 55.2758 13.514C52.5573 10.7995 48.8714 9.27259 45.0268 9.26816Z"
          fill="white"
        />
        <path
          d="M53.1378 50.0473H28.4085C28.1948 50.0473 27.9898 50.1321 27.8386 50.283C27.6875 50.434 27.6025 50.6387 27.6025 50.8521C27.6025 51.0655 27.6875 51.2702 27.8386 51.4212C27.9898 51.5721 28.1948 51.6569 28.4085 51.6569H53.1378C53.3515 51.6569 53.5565 51.5721 53.7077 51.4212C53.8588 51.2702 53.9438 51.0655 53.9438 50.8521C53.9438 50.6387 53.8588 50.434 53.7077 50.283C53.5565 50.1321 53.3515 50.0473 53.1378 50.0473Z"
          fill="#E4E4E4"
        />
        <path
          d="M53.1376 46.8644H28.4084C28.1944 46.8644 27.9892 46.9493 27.8379 47.1003C27.6866 47.2514 27.6016 47.4563 27.6016 47.67C27.6016 47.8836 27.6866 48.0885 27.8379 48.2396C27.9892 48.3907 28.1944 48.4756 28.4084 48.4756H53.1376C53.3516 48.4756 53.5568 48.3907 53.7081 48.2396C53.8594 48.0885 53.9444 47.8836 53.9444 47.67C53.9444 47.4563 53.8594 47.2514 53.7081 47.1003C53.5568 46.9493 53.3516 46.8644 53.1376 46.8644Z"
          fill="#E4E4E4"
        />
        <path
          d="M39.1283 43.683H28.4085C28.1948 43.683 27.9898 43.7678 27.8386 43.9188C27.6875 44.0697 27.6025 44.2744 27.6025 44.4878C27.6025 44.7013 27.6875 44.906 27.8386 45.0569C27.9898 45.2078 28.1948 45.2926 28.4085 45.2926H39.1283C39.342 45.2926 39.547 45.2078 39.6982 45.0569C39.8493 44.906 39.9343 44.7013 39.9343 44.4878C39.9343 44.2744 39.8493 44.0697 39.6982 43.9188C39.547 43.7678 39.342 43.683 39.1283 43.683Z"
          fill="#E4E4E4"
        />
        <path
          d="M53.1376 37.0182H28.4084C28.1944 37.0182 27.9892 37.103 27.8379 37.2541C27.6866 37.4052 27.6016 37.6101 27.6016 37.8238C27.6016 38.0374 27.6866 38.2423 27.8379 38.3934C27.9892 38.5445 28.1944 38.6294 28.4084 38.6294H53.1376C53.3516 38.6294 53.5568 38.5445 53.7081 38.3934C53.8594 38.2423 53.9444 38.0374 53.9444 37.8238C53.9444 37.6101 53.8594 37.4052 53.7081 37.2541C53.5568 37.103 53.3516 37.0182 53.1376 37.0182Z"
          fill="#E4E4E4"
        />
        <path
          d="M53.1378 33.8369H28.4085C28.1948 33.8369 27.9898 33.9216 27.8386 34.0726C27.6875 34.2235 27.6025 34.4282 27.6025 34.6416C27.6025 34.8551 27.6875 35.0598 27.8386 35.2107C27.9898 35.3616 28.1948 35.4464 28.4085 35.4464H53.1378C53.3515 35.4464 53.5565 35.3616 53.7077 35.2107C53.8588 35.0598 53.9438 34.8551 53.9438 34.6416C53.9438 34.4282 53.8588 34.2235 53.7077 34.0726C53.5565 33.9216 53.3515 33.8369 53.1378 33.8369Z"
          fill="#E4E4E4"
        />
        <path
          d="M39.1281 30.6539H28.4084C28.1944 30.6539 27.9892 30.7387 27.8379 30.8898C27.6866 31.0409 27.6016 31.2458 27.6016 31.4595C27.6016 31.6731 27.6866 31.878 27.8379 32.0291C27.9892 32.1802 28.1944 32.2651 28.4084 32.2651H39.1281C39.3421 32.2651 39.5473 32.1802 39.6986 32.0291C39.8499 31.878 39.9349 31.6731 39.9349 31.4595C39.9349 31.2458 39.8499 31.0409 39.6986 30.8898C39.5473 30.7387 39.3421 30.6539 39.1281 30.6539Z"
          fill="#E4E4E4"
        />
        <path
          d="M53.1376 23.989H28.4084C28.1944 23.989 27.9892 24.0739 27.8379 24.2249C27.6866 24.376 27.6016 24.5809 27.6016 24.7946C27.6016 25.0082 27.6866 25.2131 27.8379 25.3642C27.9892 25.5153 28.1944 25.6002 28.4084 25.6002H53.1376C53.3516 25.6002 53.5568 25.5153 53.7081 25.3642C53.8594 25.2131 53.9444 25.0082 53.9444 24.7946C53.9444 24.5809 53.8594 24.376 53.7081 24.2249C53.5568 24.0739 53.3516 23.989 53.1376 23.989Z"
          fill="#FFD633"
        />
        <path
          d="M53.1376 20.8077H28.4084C28.1944 20.8077 27.9892 20.8926 27.8379 21.0436C27.6866 21.1947 27.6016 21.3996 27.6016 21.6133C27.6016 21.8269 27.6866 22.0318 27.8379 22.1829C27.9892 22.334 28.1944 22.4189 28.4084 22.4189H53.1376C53.3516 22.4189 53.5568 22.334 53.7081 22.1829C53.8594 22.0318 53.9444 21.8269 53.9444 21.6133C53.9444 21.3996 53.8594 21.1947 53.7081 21.0436C53.5568 20.8926 53.3516 20.8077 53.1376 20.8077Z"
          fill="#FFD633"
        />
        <path
          d="M39.1281 17.6247H28.4084C28.1944 17.6247 27.9892 17.7096 27.8379 17.8606C27.6866 18.0117 27.6016 18.2166 27.6016 18.4303C27.6016 18.644 27.6866 18.8489 27.8379 18.9999C27.9892 19.151 28.1944 19.2359 28.4084 19.2359H39.1281C39.3421 19.2359 39.5473 19.151 39.6986 18.9999C39.8499 18.8489 39.9349 18.644 39.9349 18.4303C39.9349 18.2166 39.8499 18.0117 39.6986 17.8606C39.5473 17.7096 39.3421 17.6247 39.1281 17.6247Z"
          fill="#FFD633"
        />
        <path
          d="M61.0327 12.5357C64.4996 12.5357 67.3101 9.72951 67.3101 6.26787C67.3101 2.80622 64.4996 0 61.0327 0C57.5658 0 54.7554 2.80622 54.7554 6.26787C54.7554 9.72951 57.5658 12.5357 61.0327 12.5357Z"
          fill="#FFD633"
        />
        <path
          d="M60.1763 9.52999C60.0679 9.52999 59.961 9.50479 59.864 9.45637C59.7671 9.40796 59.6828 9.33766 59.6178 9.25105L57.9052 6.97106C57.8499 6.89783 57.8096 6.81443 57.7866 6.72562C57.7636 6.63682 57.7584 6.54436 57.7713 6.45355C57.7842 6.36274 57.8148 6.27535 57.8616 6.1964C57.9083 6.11745 57.9702 6.04848 58.0437 5.99345C58.1172 5.93842 58.2009 5.89841 58.2899 5.87571C58.3789 5.85302 58.4715 5.84807 58.5624 5.86117C58.6533 5.87427 58.7407 5.90515 58.8197 5.95205C58.8986 5.99894 58.9675 6.06093 59.0224 6.13445L60.1428 7.62597L63.0205 3.31609C63.1232 3.16223 63.2829 3.05542 63.4645 3.01916C63.6461 2.98289 63.8347 3.02014 63.9888 3.12272C64.1429 3.22529 64.2499 3.38478 64.2862 3.56611C64.3225 3.74743 64.2852 3.93574 64.1825 4.0896L60.7574 9.21951C60.6954 9.31229 60.6121 9.38888 60.5144 9.44286C60.4166 9.49685 60.3074 9.52665 60.1957 9.52977C60.1893 9.52988 60.1828 9.52999 60.1763 9.52999Z"
          fill="white"
        />
      </g>
      <defs>
        <clipPath id="clip0_4077_31067">
          <rect width="111" height="97" fill="white" />
        </clipPath>
      </defs>
    </svg>
  );
};

export default OtpIcon;
